------------------------  CTTY - Internal DOS Command  -------------------------

CTTY changes the standard console to an auxiliary console.

FORMAT:   CTTY device-name

REMARKS:

   device-name  - specify AUX, COM1 or COM2 to use that device as the primary
                  console.  Specify CON to reset the keyboard and screen as the
                  standard input and output devices.

EXAMPLE:

Change the console to the AUX device:

          CTTY AUX
